(rad) Chθ Cherenkov angle,

Counts (arb. unit)

0.55 0.6 0.65 0.7 0 0.2 0.4 0.6 0.8 = 5.02 TeV NNs ALICE p-Pb c < 2.6 GeV/ Tp 2.5 < +h +π_+ K p Total

0.65 0.7 0 0.2 0.4 0.6 0.8 0-5% V0A class (Pb-side) c < 4.0 GeV/ Tp 3.8 <